{"REDIRECT_HTTPS":"on","REDIRECT_SSL_TLS_SNI":"dev-galpaotms.goldieapp.com.br","REDIRECT_STATUS":"200","HTTPS":"on","SSL_TLS_SNI":"dev-galpaotms.goldieapp.com.br","HTTP_HOST":"dev-galpaotms.goldieapp.com.br","HTTP_ACCEPT":"application\/json, text\/plain, *\/*","CONTENT_TYPE":"","HTTP_SEC_FETCH_SITE":"same-origin","HTTP_ORIGIN":"https:\/\/dev-galpaotms.goldieapp.com.br","CONTENT_LENGTH":"365","HTTP_SEC_FETCH_MODE":"cors","HTTP_USER_AGENT":"Mozilla\/5.0 (iPhone; CPU iPhone OS 18_5 like Mac OS X) AppleWebKit\/605.1.15 (KHTML, like Gecko) Version\/18.5 Mobile\/15E148 Safari\/604.1","HTTP_REFERER":"https:\/\/dev-galpaotms.goldieapp.com.br\/","HTTP_SEC_FETCH_DEST":"empty","HTTP_ACCESS_CONTROL_ALLOW_ORIGIN":"*","HTTP_ACCEPT_LANGUAGE":"en-GB,en-US;q=0.9,en;q=0.8","HTTP_PRIORITY":"u=3, i","HTTP_ACCEPT_ENCODING":"gzip, deflate, br","HTTP_COOKIE":"Galaxia=kb4qljrq8vbmp4emosvql9cfmv; dashboardgalaxiaUserToken_galpaotms=eyJ0eXAiOiJKV1QiLCJhbGciOiJIUzI1NiJ9.eyJkYXRlIjoiMjAyNS0xMi0zMSAxMDozNDoxOSIsImN1c3RvbWVyIjoyMiwidXNlciI6MiwidXNlcl9vcyI6ImlQaG9uZSIsInVzZXJfYnJvd3NlciI6IkhhbmRoZWxkIEJyb3dzZXIiLCJ1c2VyX2lwIjoiMTg5LjY5LjE4MS41MSJ9.sO2BN3mr6W1lqZJR2DrZWrSwG7D8qOoHH-3CDVMy1fs","HTTP_CONNECTION":"keep-alive","PATH":"\/usr\/local\/sbin:\/usr\/local\/bin:\/usr\/sbin:\/usr\/bin:\/snap\/bin","SERVER_SIGNATURE":"<address>Apache\/2.4.58 (Ubuntu) Server at dev-galpaotms.goldieapp.com.br Port 443<\/address>\n","SERVER_SOFTWARE":"Apache\/2.4.58 (Ubuntu)","SERVER_NAME":"dev-galpaotms.goldieapp.com.br","SERVER_ADDR":"172.16.0.4","SERVER_PORT":"443","REMOTE_ADDR":"189.69.181.51","DOCUMENT_ROOT":"\/home\/goldie\/www\/genesis\/system","REQUEST_SCHEME":"https","CONTEXT_PREFIX":"","CONTEXT_DOCUMENT_ROOT":"\/home\/goldie\/www\/genesis\/system","SERVER_ADMIN":"info@pvision.com.br","SCRIPT_FILENAME":"\/home\/goldie\/www\/genesis\/system\/index.php","REMOTE_PORT":"61067","REDIRECT_URL":"\/api","REDIRECT_QUERY_STRING":"route=\/api","GATEWAY_INTERFACE":"CGI\/1.1","SERVER_PROTOCOL":"HTTP\/1.1","REQUEST_METHOD":"POST","QUERY_STRING":"route=\/api","REQUEST_URI":"\/api","SCRIPT_NAME":"\/index.php","PHP_SELF":"\/index.php","REQUEST_TIME_FLOAT":1767188069.946034,"REQUEST_TIME":1767188069}